	; Definition file for Genuwax Visual Assembler 4.5
	; (c) GenuWax 4/IX/98

	; put here all the labels refering to the modules/library
	; you want to include/use in your program
	; also defined here : the stack size !

	; [mandatory] means [var]
	; [option][whom][depend1][depend2][depend3]...

GWVA_ROOT_CTE_STACK_SIZE = 1024		; [var][mandatory]
GWVA_ROOT_MAX_PATH_LENGTH = 128		; [var][mandatory]

GWVA_ROOT_DEFINE_VA_VERSION = 4		; [var][mandatory]
GWVA_ROOT_DEFINE_VA_MAJOR = 5		; [var][mandatory]
GWVA_ROOT_DEFINE_VA_MINOR = 00		; [var][mandatory]

MDL_GEM				; [root]

LIB_FILESELECTOR			; [MDL_GEM] to use a fileselector with advanced input parameters

LIB_GET_FLENGTH			; [root]
LIB_LOAD_FILE_IN_MEM			; [LIB_GET_FLENGTH]
